##############################################################################
#
# List the test cases that are to be disabled temporarily. This file is
# used for MySQL Cluster tests only.
#
# Separate the test case name and the comment with ':'.
#   <suite>.<test> [@platform|@!platform] : <BUG#|WL#|RONDB-><XXXX> [<comment>]
#
# Note:
#   - Do not use any TAB characters for whitespace.
#   - Length of a comment section must not be more than 80 characters.
#
##############################################################################
rdrs2-golang.rdrs2-golang_batchpkread   : RONDB-718 Some error
rdrs2-golang.rdrs2-golang_stat   : RONDB-718 Not implemented yet

