##############################################################################
#
# List the test cases that are to be disabled temporarily. This file is
# used for MySQL Cluster tests only.
#
# Separate the test case name and the comment with ':'.
#   <suite>.<test> [@platform|@!platform] : <BUG#|WL#|RONDB-><XXXX> [<comment>]
#
# Note:
#   - Do not use any TAB characters for whitespace.
#   - Length of a comment section must not be more than 80 characters.
#
##############################################################################

# ndb_big suite tests
ndb_big.smoke : BUG#29110705 Not ready for automated testing yet.

# ndb_rpl suite tests
ndb_rpl.ndb_rpl_binlog_format_errors       : BUG#29776083 EXPLICIT BINLOG INJECTION WITH SELF LOGGING ENGINES IS BROKEN

# ndb suite tests
ndb.ndb_insert            : BUG#16021097 INSERT .. SELECT WITH KEY VIOLATION DOES NOT FAIL
ndb.ndb_row_count         : BUG#16021097 INSERT .. SELECT WITH KEY VIOLATION DOES NOT FAIL
ndb.ndb_parallel_undo_log : BUG#28794807 FIX NDB.NDB_PARALLEL_UNDO_LOG TESTCASE FAILURE
ndb.ndb_multi_mgmd        : WL#12345678 Can only run by itself
ndb.ndb_read_balance      : WL#12345678 Unstable results
ndb.test_mgmd             : WL#12345678 Requires fixing
ndb.ndb_basic_3rpl_2ng    : WL#12345678 Only intended for start-and-exit
ndb.ndb_restore_encrypted_backups :BUG#11761083 NDB : MYSQLD DEFAULT VALUES IN FRM EMBEDDED IN BACKUP NOT ENDIAN-CONVERTE
ndb.ndb_suma_handover     : Bug#35539093 Error insert 13048 never hit in ndb.ndb_suma_handover 

# ndb_tls suite tests
ndb_tls.clusterj  @windows: Bug#35645569 Cluster/J on Windows needs OpenSSL Applink

# Failure to acquire MDL lock properly during drop database with uppercase
# database name, affects lower_case_table_names=2 platform
ndb.ndb_addnode_restart @darwin: BUG#27307793 IDENTIFIERS AND LOWER_CASE_TABLE_NAMES=2 INCONCISTENCY

ndb.ndb_addnode_restart2: Bug#29192097 IMPROVE ABORT HANDLING OF ALTER TABLE

# The below two tests runs extra/rpl_tests/rpl_mixed_implicit_commit_binlog
# which is maintained upstream and easily breaks due to the inherent
# difference in binlog ouput depending on who is creating the binlog.
# These tests should be merged and made much more stable by not having
# to hardcode "magic" numbers into the test. Test should also be fixed
# to switch binlog_format itself if that is necessary for the test to properly
# test everything.
rpl_ndb.rpl_ndb_mixed_implicit_commit_binlog : BUG#29284229 Unstable, magic numbers causes errors
rpl_ndb.rpl_ndb_row_implicit_commit_binlog   : BUG#12586131 Fails on SET PASSWORD

# Below test disabled due to result content mismatch, test needs to be made more stable.
ndb.ndb_read_location_domain : BUG#27935436 NDB_READ_LOCATION_DOMAIN FAILURE IN PB2.

# Problem with upper case database names with lower_case_table_names = 2
ndb.ndb_database_lctn @darwin: Bug#30455400 INCORRECT SCHEMA NAME PASSED TO HA_BINLOG_LOG_QUERY DURING ALTER DATABASE

ndb.ndb_transaction_max_size @solaris: Bug#35392266 ndb_transaction_max_size fails in PB2 Solaris due to content mismatch

@import ../suite/rdrs2-golang/disabled.def
